<a href="http://bucktowngarden.com/wp-content/uploads/2013/05/IMG_6941.jpeg"><img class="alignleft size-medium wp-image-790" alt="IMG_6941" src="http://bucktowngarden.com/wp-content/uploads/2013/05/IMG_6941-182x300.jpeg" width="182" height="300" /></a>Forsythia blooms on 4/28, almost the same date 2 years ago.   The flowers are very few this year compared to last.