<tr><td><a href="http://www.bucktownarchitecture.com/wp-content/uploads/2013/07/IMG_7755.jpeg"><img class="alignleft size-medium wp-image-54" alt="IMG_7755" src="http://www.bucktownarchitecture.com/wp-content/uploads/2013/07/IMG_7755-300x200.jpeg" width="300" height="200" /></a></div>
</td>
<td>
Every building needs water.  The city is replacing a lot of water pipes in Bucktown this summer.  Not sure why they had to dig up these holes again.</td>
</tr>
<tr><td>
<a href="http://www.bucktownarchitecture.com/wp-content/uploads/2013/07/IMG_7743.jpeg"><img class="alignleft size-medium wp-image-55" alt="IMG_7743" src="http://www.bucktownarchitecture.com/wp-content/uploads/2013/07/IMG_7743-194x300.jpeg" width="194" height="300" /></td><td></a>Here's what one of the 100 year old pipes pulled from the ground look like.</td></tr>